Logic-PM-GT.exe 1 +RTS -p -hc 8,558,550 bytes x seconds Mon Jun 30 12:09 2008

seconds

0.0 5.0 10.0 15.0 20.0 25.0 30.0 35.0 bytes

0k

200k

400k

600k

800k

1,000k

(267)<*>/repeat/dnf1/runSt...

(299)ruleAndOverOr/tick/di...

(273)once/somewhere/dnf1/r...

(270)<*>/many/repeat/dnf1/...

(276)<|>/alternatives/dnf1...

(231)one/once/somewhere/dn...

(226)<*>/many/repeat/dnf1/...

(227)<|>/many/repeat/dnf1/...

(218)main

(274)one/once/somewhere/dn...