Logic-FV-GT.exe 1 +RTS -p -hc 431,373,874 bytes x seconds Mon Jun 30 12:18 2008

seconds

0.0 20.0 40.0 60.0 80.0 100.0 120.0 140.0 160.0 180.0 200.0 bytes

0M

2M

4M

6M

8M

10M

12M

14M

16M

(586)<|>/alternatives/dnf1...

(228)<*>/many/repeat/dnf1/...

(229)<|>/many/repeat/dnf1/...

(233)one/once/somewhere/dn...

(220)main

(584)one/once/somewhere/dn...